)c (GeV/ Tp 0 0.5 1 1.5 2 2.5

)^4c/^2

(GeV 2 tm - ^2m

4- 3- 2- 1- 0 1 2 3 4^{= 2.76 TeV} NN s ALICE, Pb-Pb 0-80%,